The Project Gutenberg eBook of Catalogue of S. W. Partridge & Co.'s Popular Illustrated Books

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: Catalogue of S. W. Partridge & Co.'s Popular Illustrated Books

Author: England) S. W. Partridge & Co. (London

Release date: September 9, 2015 [eBook #49919]

Most recently updated: October 24, 2024

Language: English

Credits: Produced by deaurider, Craig Kirkwood, and the Online

Distributed Proofreading Team at http://www.pgdp.net (This

file was produced from images generously made available

by The Internet Archive.)

*** START OF THE PROJECT GUTENBERG EBOOK CATALOGUE OF S. W. PARTRIDGE & CO.'S POPULAR ILLUSTRATED BOOKS ***

Catalogue

OF

S. W. PARTRIDGE & CO.’S

POPULAR ILLUSTRATED BOOKS.

CLASSIFIED ACCORDING TO PRICES.

NEW BOOKS AND NEW EDITIONS ARE MARKED WITH AN ASTERISK.

5s. each.

*A Hero King: A Romance of the Days of Alfred the Great. By Eliza F. Pollard, Author of “A Gentleman of England,” “The White Dove of Amritzir,” etc. Large Crown 8vo. Frontispiece. Cloth extra.

The Dacoit’s Treasure; or, In the Days of Po Thaw. £200 Prize Story of Burmese Life. By Henry Charles Moore. Illustrated by Harold Piffard. Large Crown 8vo. Cloth extra, gilt top.

A Gentleman of England. A Story of the Time of Sir Philip Sidney. By Eliza F. Pollard, Author of “The White Dove of Amritzir,” “Roger the Ranger,” etc. Large Crown 8vo. Cloth extra, gilt top.

Pilgrims of the Night. By Sarah Doudney, Author of “A Romance of Lincoln’s Inn,” “Louie’s Married Life,” etc. Frontispiece. Large Crown 8vo. Cloth extra, gilt top.

By G. MANVILLE FENN.

Illustrated by W. RAINEY, R.I., F. W. BURTON, etc.

*Jungle and Stream; or, The Adventures of Two Boys in Siam. Large Crown 8vo. Illustrated. Cloth extra.

Cormorant Crag: A Tale of the Smuggling Days. By G. Manville Fenn. Second Edition. Illustrated. Large Crown 8vo. Cloth extra, gilt top.

In Honour’s Cause: A Tale of the Days of George the First. By George Manville Fenn, Author of “Cormorant Crag,” etc. Large Crown 8vo. Illustrated. Cloth extra, gilt top.

Steve Young; or, The Voyage of the “Hvalross” to the Icy Seas. Large crown 8vo. Fully Illustrated. Cloth extra, gilt top.

3s. 6d. each.

*Grand Chaco (The). By G. Manville Fenn. Large Crown 8vo. 416 pages. Illustrated. Cloth extra.

*First in the Field: A Story of New South Wales. By the same Author. Large Crown 8vo. 416 pages. Illustrated. Cloth extra.

*Through Fire and Storm: Stories of Adventure and Peril. By G. A. Henty, G. Manville Fenn, and John A. Higginson. Crown 8vo. 320 pages. Frontispiece. Cloth extra, gilt top.

Skeleton Reef (The). A Sea Story. By Hugh St. Leger, Author of “An Ocean Outlaw,” etc. Large Crown 8vo. Frontispiece. Cloth extra, gilt top.

Scuttling of the “Kingfisher” (The). By Alfred E. Knight, Author of “Victoria: Her Life and Reign.” Frontispiece. Large Crown 8vo. Cloth extra, gilt top.

Missing Million (The): A Tale of Adventure in Search of a Million Pounds. By E. Harcourt Burrage, Author of “Whither Bound?” Frontispiece. Large Crown 8vo. Cloth extra, gilt top.

Come, Break Your Fast: Daily Meditations for a Year. By Rev. Mark Guy Pearse. 544 pages. Large Crown 8vo. Cloth extra.

Hymn Writers and their Hymns. By Rev. S. W. Christophers. 390 pages. Crown 8vo. Cloth extra.

Pilgrim’s Progress (The). By John Bunyan. Illustrated with 55 full-page and other Engravings, drawn by Frederick Barnard, J. D. Linton, W. Small, and engraved by Dalziel Brothers. Crown 4to. Cloth extra, 3s. 6d. (Gilt edges, 5s.)

Romance of Lincoln’s Inn (A). By Sarah Doudney, Author of “Louie’s Married Life.” Crown 8vo. Illustrated. Cloth.

Story of the Bible (The). Arranged in Simple Style for Young People. One Hundred Illustrations. Demy 8vo. Cloth extra, 3s. 6d. (Gilt edges, bevelled boards, 4s. 6d.)

Six Stories by “Pansy.” Imperial 8vo. 390 pages. Fully Illustrated and well bound in cloth, with attractive coloured design on cover, and Six complete Stories in each Vol. Vols. 1, 2, 3, 4, and 5, 3s. 6d. each.

Two Henriettas (The). By Emma Marshall, Author of “Eaglehurst Towers,” etc. Illustrated. Large Crown 8vo. Cloth extra, gilt top.

White Dove of Amritzir (The): A Romance of Anglo-Indian Life. By Eliza F. Pollard, Author of “Roger the Ranger,” etc. Large Crown 8vo. Illustrated. Cloth extra, gilt top.

2s. 6d. each.

“ROMANCE OF COLONIZATION.”

Special attention is requested to this well-written and up-to-date Series of books on the development of British Colonization from its commencement to the present day.

Crown 8vo. Frontispiece. 320 pages. Cloth extra, 2s. 6d. each.

*IV.—Canada: Its Rise and Progress. By G. Barnett Smith.

I.—The United States of America to the Time of the Pilgrim Fathers. By G. Barnett Smith.

II.—The United States of America to the Present Day. By G. Barnett Smith.

III.—India. By Alfred E. Knight.

*The Son of Ingar: A Story of the Days of the Apostle Paul. By K. P. Woods. Frontispiece. Crown 8vo. Cloth extra.

Victoria: Her Life and Reign. By Alfred E. Knight. New Edition. Large Crown 8vo. 320 pages. Cloth extra, 2s. 6d.; fancy cloth, gilt edges, 3s. 6d.; half morocco, or half calf, marbled edges, net 7s. 6d.; full morocco, or calf, gilt edges, net 10s. 6d.

John: A Tale of the Messiah. By K. Pearson Woods. Frontispiece. Crown 8vo. Cloth extra.

Brought to Jesus: A Bible Picture Book for Little Readers. Containing Twelve large New Testament Scenes, printed in colours, with appropriate letterpress by Mrs. G. E. Morton. Size, 13 1/2 by 10 inches. Handsome coloured boards with cloth back.

Bible Pictures and Stories. Old and New Testament. In one Volume. Bound in handsome cloth, with eighty-nine full-page Illustrations by Eminent Artists.

Light for Little Footsteps; or, Bible Stories Illustrated. By the Author of “A Ride to Picture Land,” etc. With beautiful coloured Cover and Frontispiece. Full of Pictures.

Potters: Their Arts and Crafts. Historical, Biographical, and Descriptive. By John C. Sparkes (Principal of the Royal College of Art, South Kensington Museum), and Walter Gandy. Crown 8vo. Copiously Illustrated. Cloth extra, 2s. 6d.; art linen, gilt edges, 3s. 6d.

Story of Jesus. For Little Children. By Mrs. G. E. Morton, Author of “Wee Donald,” etc. Many Illustrations. Imperial 16mo.

Sunshine for Showery Days: A Children’s Picture-Book. By the Author of “A Ride to Picture Land,” etc. Size, 15 1/2 by 11 inches. Coloured Frontispiece, and 114 full-page and other Engravings. Coloured paper boards, with cloth back.

Spiritual Grasp of the Epistles (The); or, an Epistle a-Sunday. By Rev. Charles A. Fox, Author of “Lyrics from the Hills,” etc. Small Crown 8vo. Cloth boards. (Not illustrated.)

Upward and Onward. A Thought Book for the Threshold of Active Life. By S. W. Partridge. (Fourteenth Thousand.) Cloth boards, 2s. 6d. (Not Illustrated.)

THE “RED MOUNTAIN” SERIES.

Crown 8vo. 320 Pages. Illustrated. Handsomely bound in cloth boards. 2s. 6d. each.

*Norcliffe Court. By John W. Kneeshaw, Author of “A Black Shadow,” “From Dusk to Dawn,” etc.

*The Inca’s Ransom: A Story of the Conquest of Peru. By Albert Lee, Author of “The Black Disc,” “The Prince’s Messenger,” etc.

*Adventures of Mark Paton (The). By Charles J. Mansford, Author of “Shafts from an Eastern Quiver,” etc.

*Adventures of Don Lavington (The). By G. Manville Fenn. Illustrated. Large Crown 8vo. Cloth extra.

*Crystal Hunters (The): A Boy’s Adventures in the Higher Alps. By G. Manville Fenn. Illustrated. Large Crown 8vo. Cloth extra.

*In Battle and Breeze. Sea Stories by G. A. Henty, G. Manville Fenn, and E. Harcourt Burrage.

A Polar Eden: or, The Goal of the “Dauntless.” By Charles R. Kenyon, Author of “The Young Ranchman,” etc.

By Sea-Shore, Wood, and Moorland: Peeps at Nature. By Edward Step, Author of “Plant Life,” etc.

Eaglehurst Towers. By Emma Marshall, Author of “Fine Gold,” etc.

Eagle Cliff (The): A Tale of the Western Isles. By R. M. Ballantyne, Author of “Fighting the Flames,” “The Lifeboat,” etc.

Edwin, The Boy Outlaw; or, The Dawn of Freedom in England. A Story of the Days of Robin Hood. By J. Frederick Hodgetts, Author of “Older England,” etc.

England’s Navy: Stories of its Ships and its Services. With a Glance at some Navies of the Ancient World. By F. M. Holmes, Author of “Great Works by Great Men,” etc.

Green Mountain Boys (The): A Story of the American War of Independence. By Eliza F. Pollard, Author of “True unto Death,” “Roger the Ranger,” etc., etc.

Great Works by Great Men: The Story of Famous Engineers and their Triumphs. By F. M. Holmes.

Lady of the Forest (The). By L. T. Meade, Author of “Scamp and I,” “Sweet Nancy,” etc.

Leaders Into Unknown Lands: Being Chapters of Recent Travel. By A. Montefiore-Brice, F.G.S., F.R.G.S. Maps, etc.

Lion City of Africa (The): A Story of Adventure. By Willis Boyd Allen, Author of “The Red Mountain of Alaska,” etc.

Mark Seaworth: A Tale of the Indian Archipelago. By W. H. G. Kingston, Author of “Manco, the Peruvian Chief.”

Manco, The Peruvian Chief. By W. H. G. Kingston. New Edition. Illustrated by Launcelot Speed.

Olive Chauncey’s Trust. By Mrs. E. R. Pitman, Author of “Lady Missionaries in Foreign Lands.”

Roger the Ranger: A Story of Border Life among the Indians. By Eliza F. Pollard, Author of “Not Wanted,” etc.

Red Mountain of Alaska (The). By Willis Boyd Allen, Author of “Pine Cones,” “The Northern Cross,” etc.

Slave Raiders of Zanzibar (The). By E. Harcourt Burrage, Author of “Gerard Mastyn,” “Whither Bound?” etc.

Spanish Maiden (The): A Story of Brazil. By Emma E. Hornibrook, Author of “Worth the Winning,” etc.

True unto Death: A Story of Russian Life and the Crimean War. By Eliza F. Pollard, Author of “Roger the Ranger.”

Yashti Savage: The Story of a Gipsy Girl. By Sarah Tytler.

Whither Bound? A Story of Two Lost Boys. By Owen Landor. With Twenty Illustrations by W. Rainey, R.I.

Young Moose Hunters (The): A Backwoods-Boy’s Story. By C. A. Stephens. Profusely Illustrated.

2s. each.

The Friends of Jesus. Illustrated Sketches for the young, of the Twelve Apostles, the Family at Bethany, and other of the earthly friends of the Saviour. Small 4to. Cloth extra.

Animals and their Young. By Harland Coultas. With Twenty-four full-page Illustrations by Harrison Weir. Fcap. 4to. Cloth gilt, bevelled boards.

Domestic Pets: Their Habits and Treatment. Anecdotal and Descriptive. Full of Illustrations. Fcap. 4to. Cloth extra.

Our Dumb Companions. By Rev. T. Jackson, M.A. One Hundred and Twenty Illustrations. Fcap. 4to. Cloth extra.

*Bible Picture Roll. Containing a large Engraving of a Scripture Subject, with letterpress for each day in the month.

Sunny Teachings. (New Series.) A Bible Picture Roll containing Twelve beautifully Coloured Scripture Pictures selected from the New Testament. Mounted on roller.

Young Folk’s Bible Picture Roll (The). Contains Twelve beautifully Coloured Pictures of Bible Subjects. Printed on good paper, and mounted on roller, with cord for hanging up.

Natural History Picture Roll. Consisting of Thirty-one Illustrated Leaves, with simple large-type Letterpress, suitable to hang up in the Nursery, Schoolroom, etc.

THE HOME LIBRARY.

Crown 8vo. 320 pages. Handsome Cloth Cover. Illustrations.

*Clouds that Pass. By E. Gertrude Hart.

*A Child of Genius. By Lily Watson.

*Out of the Deep. By E. Harcourt Burrage.

*Miss Elizabeth’s Niece. By M. S. Haycraft.

*Through the Crucible. By J. Harwood Panting.

*More Precious than Gold. By Jennie Chappell.

*John Halifax, Gentleman. By Mrs. Craik. New Edition. 540 pages.

Ailsa’s Reaping; or, Grape-Vines and Thorns. By Jennie Chappell.

Avice: A Story of Imperial Rome. By Eliza F. Pollard.

Brownie; or, The Lady Superior. By Eliza F. Pollard.

Ben-Hur. By L. Wallace.

Better Part (The). By Annie S. Swan.

Bunch of Cherries (A). By J. W. Kirton.

Cousin Mary. By Mrs. Oliphant, Author of “Chronicles of Carlingford,” etc.

Dr. Cross; or, Tried and True. By Ruth Sterling.

Dorothy’s Training; or, Wild-Flower or Weed? By Jennie Chappell.

Edith Oswald; or, Living for Others. 224 pages. By Jane M. Kippen.

For Honour’s Sake. By Jennie Chappell.

Gerard Mastyn; or, The Son of a Genius. By E. Harcourt Burrage.

Gerald Thurlow; or, The New Marshal. By T. M. Browne.

Honor: A Nineteenth Century Heroine. By E. M. Alford.

Household Angel (The). By Madeline Leslie.

Her Saddest Blessing. By Jennie Chappell.

Jacques Hamon; or, Sir Philip’s Private Messenger. By Mary E. Ropes.

Living It Down. By Laura M. Lane.

Louie’s Married Life. By Sarah Doudney.

Madeline; or, The Tale of a Haunted House. By Jennie Chappell.

Morning Dew-Drops. By Clara Lucas Balfour.

Mark Desborough’s Vow. By Annie S. Swan.

Mick Tracy, the Irish Scripture Reader. By the Author of “Tim Doolan, the Irish Emigrant.”

Naomi; or, The Last Days of Jerusalem. By Mrs. Webb.

Pilgrim’s Progress (The). By John Bunyan. 416 pages. 47 Illustrations.

Petrel Darcy; or, In Honour Bound. By T. Corrie.

Strait Gate (The). By Annie S. Swan.

Tangled Threads. By Esma Stuart.

Tom Sharman and his College Chums. By J. O. Keen, D.D.

Uncle Tom’s Cabin. By Harriet Beecher Stowe.

Village Story (A). By Mrs. G. E. Morton, Author of “The Story of Jesus,” etc.

Without a Thought; or, Dora’s Discipline. By Jennie Chappell.

Way in the Wilderness (A). By Maggie Swan.

By “PANSY.”

Chrissy’s Endeavour.

Three People.

Four Girls at Chautauqua.

An Endless Chain.

The Chautauqua Girls at Home.

Wise and Otherwise.

Ruth Erskine’s Crosses.

Ester Ried.

Ester Ried Yet Speaking.

Julia Ried.

The Man of the House.

Over 385,000 of these volumes have already been sold.

1s. 6d. each.

THE “WORLD’S WONDERS” SERIES.

A Series of Popular Books treating of the present-day wonders of Science and Art. Well written, printed on good paper, and fully illustrated. Crown 8vo, 160 pages. Handsome Cloth Cover.

*Marvels of Ant Life. By W. F. Kirby, F.L.S., F.E.S., of the Natural History Museum, South Kensington.

*The Romance of the Savings Banks. By Arch. G. Bowie.

*The Romance of Glass-Making: A Sketch of the History of Ornamental Glass. By W. Gandy.

The Romance of the Post Office: Its Inception and Wondrous Development. By Arch. G. Bowie.

Marvels of Metals. By F. M. Holmes.

Miners and their Works Underground. By F. M. Holmes.

Triumphs of the Printing Press. By Walter Jerrold.

Astronomers and their Observations. By Lucy Taylor. With Preface by W. Thynne Lynn, B.A., F.R.A.S.

Celebrated Mechanics and their Achievements. By F. M. Holmes.

Chemists and their Wonders. By F. M. Holmes.

Engineers and their Triumphs. By F. M. Holmes.

Electricians and their Marvels. By Walter Jerrold.

Musicians and their Compositions. By J. R. Griffiths.

Naturalists and their Investigations. By George Day, F.R.M.S.

NEW SERIES OF MISSIONARY BIOGRAPHIES.

Crown 8vo. 160 pages. Cloth extra. Fully Illustrated.

Amid Greenland Snows; or, The Early

History of Arctic Missions.

Bishop Patteson, the Martyr of Melanesia. } By

Jesse

Page.

Captain Allen Gardiner: Sailor and Saint. By Jesse Page, Author of “Japan, its People and Missions,” etc.

Congo for Christ (The): The Story of the Congo Mission. By Rev. J. B. Myers, Author of “William Carey,” etc.

David Brainerd, the Apostle to the North American Indians. By Jesse Page.

Henry Martyn: His Life and Labours—Cambridge, India, Persia. By Jesse Page.

Japan: Its People and Missions. By Jesse Page.

John Williams, the Martyr Missionary of Polynesia. By Rev. James J. Ellis.

James Calvert; or, From Dark to Dawn in Fiji. By R. Vernon.

Lady Missionaries in Foreign Lands. By Mrs. E. R. Pitman, Author of “Vestina’s Martyrdom,” etc.

Madagascar: Its Missionaries and Martyrs. By William J. Townsend, Author of “Robert Morrison,” etc.

Missionary Heroines in Eastern Lands. By Mrs. E. R. Pitman, Author of “Lady Missionaries in Foreign Lands.”

Reginald Heber, Bishop of Calcutta, Author of “From Greenland’s Icy Mountains.” By A. Montefiore, F.R.G.S.

Robert Moffat, the Missionary Hero of Kuruman. By David J. Deane.

Samuel Crowther, the Slave Boy who became Bishop of the Niger. By Jesse Page.

Thomas Birch Freeman, Missionary Pioneer to Ashanti, Dahomey, and Egba. By Rev. John Milum, F.R.G.S.

Thomas J. Comber, Missionary Pioneer to the Congo. By Rev. J. B. Myers, Association Secretary, Baptist Missionary Society.

Tiyo Soga: The Model Kaffir Missionary. By H. T. Cousins, Ph.D., F.R.G.S.

William Carey, the Shoemaker who became the Father and Founder of Modern Missions. By Rev. J. B. Myers.

NEW POPULAR BIOGRAPHIES.

Crown 8vo. 160 pages. Maps and Illustrations. Cloth extra.

*Four Noble Women and their Work: Sketches of the Life and Work of Frances Willard, Agnes Weston, Sister Dora, and Catherine Booth. By Jennie Chappell.

Canal Boy who became President (The). By Frederic T. Gammon. Twelfth Edition. Thirty-fourth Thousand.

David Livingstone: His Labours and His Legacy. By Arthur Montefiore-Brice, F.G.S., F.R.G.S.

Florence Nightingale, the Wounded Soldier’s Friend. By Eliza F. Pollard.

Four Heroes of India: Clive, Warren Hastings, Havelock, Lawrence. By F. M. Holmes.

Fridtjof Nansen: His Life and Explorations. By J. Arthur Bain.

General Gordon, the Christian Soldier and Hero. By G. Barnett Smith.

Gladstone (W. E.): England’s Great Commoner. By Walter Jerrold. With Portrait and thirty-eight other Illustrations.

Heroes and Heroines of the Scottish Covenanters. By J. Meldrum Dryerre, LL.B., F.R.G.S.

John Knox and the Scottish Reformation. By G. Barnett Smith.

Michael Faraday, Man of Science. By Walter Jerrold.

Philip Melancthon: The Wittemberg Professor and Theologian of the Reformation. By David J. Deane, Author of “Two Noble Lives,” etc.

Sir Richard Tangye (“One and All”). An Autobiography. With Twenty-one Original Illustrations by Frank Hewitt. (192 pages.)

Sir John Franklin and the Romance of the North-West Passage. By G. Barnett Smith.

Slave and His Champions (The): Sketches of Granville Sharp, Thomas Clarkson, William Wilberforce, and Sir T. F. Buxton. By C. D. Michael.

Stanley (Henry M.), the African Explorer. By Arthur Montefiore-Brice, F.G.S., F.R.G.S.

Spurgeon (C. H.): His Life and Ministry. By Jesse Page.

Two Noble Lives: JOHN WICLIFFE, the Morning Star of the Reformation; and MARTIN LUTHER, the Reformer. By David J. Deane. (208 pages.)

Through Prison Bars: The Lives and Labours of John Howard and Elizabeth Fry, the Prisoner’s Friends. By William H. Render.

William Tyndale, the Translator of the English Bible. By G. Barnett Smith.

Over 430,000 of these popular volumes have already been sold.

THE BRITISH BOYS’ LIBRARY.

A New Series of 1s. 6d. books for boys.

Illustrated. Crown 8vo. Cloth extra.

*The Old Red School House. A Story of the Backwoods. By Frances H. Wood.

*Ben: A Story of Life’s Byways. By Lydia Phillips, Author of “Frank Burleigh.”

*The Secret of the Yew. By Frank Yerlock.

*Major Brown; or, Whether White or Black, a Man! By Edith S. Davis.

The Bell Buoy; or, The Story of a Mysterious Key. By F. M. Holmes.

Jack. A Story of a Scapegrace. By E. M. Bryant.

Hubert Ellerdale: A Tale of the Days of Wicliffe. By W. Oak Rhind.

THE BRITISH GIRLS’ LIBRARY.

A New Series of 1s. 6d. books for girls.

Illustrated. Crown 8vo. Cloth extra.

*Regia; or, Her Little Kingdom. By E. M. Waterworth and Jennie Chappell.

*Uno’s Marriage. By Mrs. Haycraft.

*Tephi: An Armenian Romance. By Cecilia M. Blake.

*Christabel. By J. Goldsmith Cooper, Author of “Nella.”

Sweet Kitty Claire. By Jennie Chappell.

The Maid of the Storm: A Story of a Cornish Village. By Nellie Cornwall.

Mistress of the Situation (The). By Jennie Chappell.

Queen of the Isles. By Jessie M. E. Saxby.

NEW PICTURE BOOKS.

Happy and Gay: Pictures and Stories for Every Day. By D. J. D., Author of “Stories of Animal Sagacity,” etc. With 8 coloured and 97 other Illustrations. Size 9 by 7 inches. Handsome coloured covers, paper boards with cloth backs.

Pleasures and Joys for Girls and Boys. By D. J. D., Author of “Anecdotes of Animals and Birds.” With 8 coloured and 111 other Illustrations. Size 9 by 7 inches. Handsome coloured cover, paper boards and cloth back.

Anecdotes of Animals and Birds. By Uncle John. With 57 full-page and other Illustrations by Harrison Weir, etc. Fcap. 4to. 128 pages. Handsomely bound in paper boards, with Animal design in 10 colours, varnished. (A charming book for the Young.)

Stories of Animal Sagacity. By D. J. D. A companion volume to “Anecdotes of Animals.” Numerous full-page Illustrations. Handsomely bound in paper boards, with Animal subject printed in 10 colours, varnished.

ILLUSTRATED REWARD BOOKS.

Crown 8vo. 160 pages. Cloth extra. Fully Illustrated.

*The Legend of the Silver Cup. Allegories for Children. By Rev. G. Critchley, B.A. With 12 Illustrations. (Small quarto.)

Aileen; or, “The Love of Christ Constraineth Us.” By Laura A. Barter, Author of “Harold; or, Two Died for Me.”

Duff Darlington; or, An Unsuspected Genius. By Evelyn Everett-Green. With six Illustrations by Harold Copping.

Everybody’s Friend; or, Hilda Danvers’ Influence. By Evelyn Everett-Green, Author of “Barbara’s Brother,” etc.

Fine Gold; or, Ravenswood Courtenay. By Emma Marshall, Author of “Eaglehurst Towers,” etc.

Jack’s Heroism. A Story of Schoolboy Life. By Edith C. Kenyon.

Marigold. By L. T. Meade, Author of “Lady of the Forest,” etc.

Nella; or, Not My Own. By Jessie Goldsmith Cooper.

Our Duty to Animals. By Mrs. C. Bray, Author of “Physiology for Schools,” etc. Intended to teach the young kindness to animals. Cloth, 1s. 6d.; School Edition, 1s. 3d.

Raymond and Bertha: A Story of True Nobility. By L. Phillips, Author of “Frank Burleigh; or, Chosen to be a Soldier.”

Rose Capel’s Sacrifice; or, A Mother’s Love. By Mrs. Haycraft, Author of “Like a Little Candle,” “Chine Cabin,” etc.

Satisfied. By Catherine M. Trowbridge.

Sisters-in-Love. By Jessie M. E. Saxby, Author of “Dora Coyne,” “Sallie’s Boy,” etc. Illustrated by W. Rainey, R.I.

Ted’s Trust; or, Aunt Elmerley’s Umbrella. By Jennie Chappell, Author of “Who was the Culprit?” etc.

Thomas Howard Gill: His Life and Work. By Eliza F. Pollard, Author of “Florence Nightingale,” etc.

Tamsin Rosewarne and Her Burdens: A Tale of Cornish Life. By Nellie Cornwall.

*Our Exemplar; or, What would Jesus do? By Charles M. Sheldon, Author of “The Crucifixion of Philip Strong,” etc. 320 pages. Stiff paper Covers, 1s. 6d. Cloth boards, 2s. This remarkable book has already had a sale in America of 185,000 copies.

The Crucifixion of Phillip Strong. By Charles M. Sheldon, Author of “Our Exemplar,” etc. Stiff paper covers, 1s. 6d.; cloth boards, 2s.

*Insects: Foes and Friends. By W. Egmont Kirby, M.D., F.L.S., with Preface by W. F. Kirby, F.L.S., F.E.S., of the Natural History Museum, South Kensington. Demy 16mo. 32 pages of coloured Illustrations and 144 pages of descriptive letterpress. Cloth boards, 1s. 6d.

1s. each.

ONE SHILLING REWARD BOOKS.

Fully Illustrated. 96 pages. Crown 8vo. Cloth extra.

*Dumpy Dolly. By E. M. Waterworth, Author of “Master Lionel,” “Lady Betty’s Twins,” etc.

*A Venturesome Voyage. By F. Scarlett Potter, Author of “The Farm by the Wood,” etc.

*The Pilgrim’s Progress. By John Bunyan. 416 pages. 47 Illustrations.

Always Happy; or, The Story of Helen Keller. By Jennie Chappell, Author of “Ted’s Trust.”

Birdie’s Benefits; or, A Little Child Shall Lead Them. By Ethel Ruth Boddy.

Band of Hope Companion (The). A Hand-book for Band of Hope Members: Biographical, Historical, Scientific, and Anecdotal. By Alf. G. Glasspool.

Carol’s Gift; or, “What Time I am Afraid I will Trust in Thee.” By Jennie Chappell, Author of “Without a Thought,” etc.

Brave Bertie. By Edith Kenyon, Author of “Jack’s Heroism,” “Hilda; or, Life’s Discipline,” etc.

Children of Cherryholme (The). By M. S. Haycraft, Author of “Like a Little Candle,” “Chine Cabin,” etc.

Cared For; or, The Orphan Wanderers. By Mrs. C. E. Bowen, Author of “Dick and his Donkey,” etc.

Farm by the Wood (The). By F. Scarlett Potter, Author of “Phil’s Frolic,” etc.

Frank Burleigh; or, Chosen to be a Soldier. By L. Phillips.

Frank Spencer’s Rule of Life. By J. W. Kirton, Author of “Buy Your Own Cherries.”

Grannie’s Treasures, and How They Helped Her. By L. E. Tiddeman.

His Majesty’s Beggars. By Mary E. Ropes, Author of “Bel’s Baby,” etc.

Harold; or, Two Died for Me. By Laura A. Barter.

Jack the Conqueror; or, Difficulties Overcome. By the Author of “Dick and his Donkey.”

Jenny’s Geranium; or, The Prize Flower of a London Court.

Jim’s Discovery; or, On the Edge of a Desert. By T. M. Browne, Author of “Dawson’s Madge,” etc.

Little Bunch’s Charge; or, True to Trust. By Nellie Cornwall, Author of “Tamsin Rosewarne,” etc.

Losing and Finding; or, The Moonstone Ring. By Jennie Chappell, Author of “Who was the Culprit?” etc.

Little Woodman and his Dog Cæsar (The). By Mrs. Sherwood.

Little Bugler (The): A Tale of the American Civil War. By George Munroe Royce. New Edition.

Lady Betty’s Twins. By E. M. Waterworth, Author of “Master Lionel,” “Twice Saved,” etc.

Marjory; or, What Would Jesus do? By Laura A. Barter, Author of “Harold; or, Two Died for Me.”

Old Goggles; or, The Brackenhurst Bairns’ Mistake. By M. S. Haycraft, Author of “The Children of Cherryholme,” etc.

Our Den. By E. M. Waterworth, Author of “Master Lionel, that Tiresome Child.”

Raymond’s Rival; or, Which will Win? By Jennie Chappell, Author of “Losing and Finding,” etc.

Recitations and Concerted Pieces for Bands of Hope, Sunday Schools, etc. Compiled by James Weston.

Sweet Nancy. By L. T. Meade, Author of “Scamp and I,” “A Band of Three,” etc.

Twice Saved; or, Somebody’s Pet and Nobody’s Darling. By E. M. Waterworth, Author of “Our Den,” “Master Lionel,” etc.

Three Runaways. By F. Scarlett Potter, Author of “Phil’s Frolic,” “Hazelbrake Hollow,” etc.

Una Bruce’s Troubles. By Alice Price, Author of “Hamilton of King’s,” etc. Illustrated by Harold Copping.

Under the Blossom. By Margaret Haycraft, Author of “Like a Little Candle; or, Bertrand’s Influence,” etc.

Who was the Culprit? By Jennie Chappell, Author of “Her Saddest Blessing,” “The Man of the Family,” etc.

POPULAR SHILLING SERIES.

Crown 8vo, well printed on good paper, and bound in attractive and tasteful coloured paper covers. Fully Illustrated.

Cousin Mary. By Mrs. Oliphant.

Louie’s Married Life. By Sarah Doudney.

The Strait Gate.

Grandmother’s Child,

and For Lucy’s Sake. } By

Annie S.

Swan.

Living it Down. By Laura M. Lane.

Eaglehurst Towers. By Mrs. Emma Marshall.

Without a Thought.

Her Saddest Blessing. } By Jennie

Chappell.

Fine Gold; or, Ravenswood Courtenay. By Emma Marshall.

The above can also be had in fancy cloth, price 1s. 6d.

CHEAP REPRINTS OF POPULAR STORIES FOR THE YOUNG.

Crown 8vo. 160 pages. Illustrated. Cloth boards, 1s. each.

*Claire; or, A Hundred Years Ago. By T. M. Browne, Author of “Jim’s Discovery,” etc.

*The Minister’s Money. By Eliza F. Pollard, Author of “True unto Death,” etc.

*Nobly Planned. By M. B. Manwell, Author of “Mother’s Boy,” etc.

*Her Two Sons. A Story for Young Men and Maidens. By Mrs. Charles Garnett.

Rag and Tag: A Plea for the Waifs and Strays of Old England. By Mrs. E. J. Whittaker.

Through Life’s Shadows. By Eliza F. Pollard.

The Little Princess of Tower Hill. By L. T. Meade.

Clovie and Madge. By Mrs. G. S. Reaney.

The Best Things.

Rays from the Sun. } By

Dr. Newton.

Ellerslie House: A Book for Boys. By Emma Leslie.

Manchester House: A Tale of Two Apprentices. By J. Capes Story.

Like a Little Candle; or, Bertrand’s Influence. By Mrs. Haycraft.

Violet Maitland; or, By Thorny Ways. By Laura M. Lane.

Martin Redfern’s Oath. By Ethel F. Heddle.

Dairyman’s Daughter (The). By Legh Richmond.

PICTURE BOOKS FOR THE YOUNG.

Fcap. 4to. With Coloured Covers, and Full of Illustrations.

*Ring o’ Roses: Pictures and Stories for Little Folks. By Uncle Jack, Author of “Frolic and Fun,” etc. Four Full-page coloured and numerous other Illustrations.

*Holiday Joys: Stories and Pictures for Girls and Boys. By C. D. M., Author of “Merry Playmates,” etc. Four full-page coloured and numerous other Illustrations.

Frolic and Fun: Pictures and Stories for Every One. By Uncle Jack, Author of “Follow the Drum,” etc. Four full-page coloured and numerous other Illustrations.

Merry Playmates: Pictures and Stories for Little Folks. By C. D. M., Author of “Brightness and Beauty,” etc. Four full-page coloured and numerous other Illustrations.

Follow the Drum: Pictures and Stories for Cheerful and Glum. By Uncle Jack, Author of “Bright Beams and Happy Scenes,” etc. Four full-page coloured and numerous other illustrations.

Off and Away: Pictures and Stories for Grave and Gay. By C. D. M., Author of “Brightness and Beauty,” etc. Four full-page coloured, and numerous other Illustrations.

Bible Pictures and Stories. Old Testament. By D. J. D., Author of “Pets Abroad,” etc. With Forty-four full-page Illustrations. Coloured paper boards, 1s.; cloth gilt, 1s. 6d.

Bible Pictures and Stories. New Testament. By James Weston and D. J. D. With Forty-five beautiful full-page Illustrations by W. J. Webb, Sir John Gilbert, and others. New Edition. Fcap. 4to. Illustrated boards, 1s.; cloth, extra, 1s. 6d.

Bright Beams and Happy Scenes: A Picture Book for Little Folk. By J. D. Four full-page coloured and numerous other Illustrations. Coloured paper cover, 1s.; cloth, 1s. 6d.

Holiday Hours in Animal Land. (New Series.) By Uncle Harry. Four full-page coloured and numerous other Illustrations. Coloured paper cover, 1s.; cloth, 1s. 6d.

Merry Moments. A Picture Book for Lads and Lasses. By C. D. M. Four full-page coloured and many other Illustrations. Coloured paper cover, 1s.; cloth, 1s. 6d.

BOOKS BY REV. DR. NEWTON.

New and Cheap Edition. 160 pages. Crown 8vo. Prettily bound in cloth boards, 1s. each.

Bible Jewels.

Bible Wonders.

Rills from the Fountain of Life.

The Giants, and How to Fight Them.

Specially suitable for Sunday School Libraries and Rewards.

*Molly and I. By the Author of “Jack,” “At Sunset,” etc. Long 8vo. Illustrated Title Page. 1s.

Cicely’s Little Minute. By Harvey Gobel. Long 8vo. Illustrated Title Page. Cloth extra. 1s.

*Uncrowned Queens. By Charlotte Skinner, Author of “Sisters of the Master.” Small 8vo. 112 pages. Cloth.

Sisters of the Master. By Charlotte Skinner, Author of “The Master’s Gifts to Women.”

The Master’s Gifts to Women. By Mrs. Charlotte Skinner. Small 8vo. 112 pages. Cloth.

The Master’s Messages to Women. By Mrs. Charlotte Skinner. (Uniform with the above.)

Some Secrets of Christian Living. Selections from the “Seven Rules” Series of Booklets. Small 8vo, cloth boards.

Daybreak in the Soul. By the Rev. E. W. Moore, M.A., Author of “The Overcoming Life.” Imperial 32mo. 144 pages. Cloth.

Steps to the Blessed Life. Selections from the “Seven Rules” Series of Booklets. By Rev. F. B. Meyer, B.A. Small Crown 8vo, cloth boards.

Thoroughness: Talks to Young Men. By Thain Davidson, D.D. Small Crown 8vo. Cloth extra.

Women of the Bible. (Old Testament). By Etty Woosnam. Third Edition. Royal 16mo. Cloth.

9d. each.

NINEPENNY SERIES OF ILLUSTRATED BOOKS.

96 pages. Small Crown 8vo. Illustrated. Handsome Cloth Covers.

*Rob and I; or, By Courage and Faith. By C. A. Mercer.

*Phil’s Frolic. By F. Scarlett Potter.

*How a Farthing Made a Fortune; or, Honesty is the Best Policy. By Mrs. C. E. Bowen.

A Flight with the Swallows. By Emma Marshall.

Babes in the Basket (The); or, Daph and Her Charge.

Bel’s Baby. By Mary E. Ropes.

Benjamin Holt’s Boys, and What They Did for Him. By the Author of “A Candle Lighted by the Lord.”

Ben’s Boyhood. By the Author of “Jack the Conqueror.”

Ben Owen: A Lancashire Story. By Jennie Perrett.

Cousin Bessie: A Story of Youthful Earnestness. By Clara Lucas Balfour.

Dawson’s Madge; or, The Poacher’s Daughter. By T. M. Browne, Author of “The Musgrove Ranch,” etc.

Five Cousins (The). By Emma Leslie.

Foolish Chrissy; or, Discontent and its Consequences. By Meta, Author of “Noel’s Lesson,” etc.

For Lucy’s Sake. By Annie S. Swan.

Giddie Garland; or, The Three Mirrors. By Jennie Chappell.

Grandmother’s Child. By Annie S. Swan.

How Paul’s Penny Became a Pound. By Mrs. Bowen, Author of “Dick and his Donkey.”

How Peter’s Pound Became a Penny. By the same Author.

Jean Jacques: A Story of the Franco-Prussian War. By Isabel Lawford.

John Oriel’s Start in Life. By Mary Howitt.

Left with a Trust. By Nellie Hellis.

Letty; or, The Father of the Fatherless. By H. Clement, Author of “Elsie’s Fairy Bells.”

Master Lionel, that Tiresome Child. By E. M. Waterworth.

Man of the Family (The). By Jennie Chappell.

Mattie’s Home; or, The Little Match-girl and her Friends.

Paul, A Little Mediator. By Maude M. Butler.

Sailor’s Lass (A). By Emma Leslie.

6d. each.

NEW SERIES OF SIXPENNY PICTURE-BOOKS.

Crown quarto. Fully Illustrated. Handsomely bound in paper boards, with design printed in Eight colours.

*Dollies’ Schooltime: Pictures and Stories in Prose and Rhyme.

*Birdie’s Message: The Little Folks’ Picture Book.

Sweet Stories Retold. A Bible Picture-Book for Young Folks.

After School.

Doggies’ Doings and Pussies’ Wooings.

Little Snowdrop’s Bible Picture-Book.

This New Series of Picture Books surpasses, in excellence of illustration and careful printing, all others at the price.

THE “RED DAVE” SERIES.

New and Enlarged Edition, with Coloured Frontispieces. Handsomely bound in cloth boards.

*Joe and Sally; or, A Good Deed and its Fruits.

*The Island Home. By F. M. Holmes.

*Chrissy’s Treasure. By Jennie Perrett.

*Puppy-Dog Tales. By Various authors.

Mother’s Boy. By M. B. Manwell.

A Great Mistake. By Jennie Chappell.

From Hand to Hand. By C. J. Hamilton.

That Boy Bob. By Jesse Page.

Buy Your Own Cherries. By J. W. Kirton.

Owen’s Fortune. By Mrs. F. West.

Only Milly; or, A Child’s Kingdom.

Shad’s Christmas Gift.

Greycliffe Abbey.

Red Dave; or, What Wilt Thou have Me to do?

Harry’s Monkey: How it Helped the Missionaries.

Snowdrops; or, Life from the Dead.

Dick and his Donkey; or, How to Pay the Rent.

Herbert’s First Year at Bramford.

Lost in the Snow; or, The Kentish Fisherman.

The Pearly Gates.

Jessie Dyson.

Maude’s Visit to Sandybeach.

Friendless Bob, and other Stories.

Come Home, Mother.

Sybil and her Live Snowball.

Only a Bunch of Cherries.

Daybreak.

Bright Ben: The Story of a Mother’s Boy.

THE MARIGOLD SERIES.

An entirely new and unequalled series of standard stories, printed on good laid paper. Imperial 8vo. 128 pages. Illustrated covers with vignetted design printed in EIGHT COLOURS. Price 6D. each, NETT.

Pride and Prejudice. By Jane Austen.

From Jest to Earnest. By E. P. Roe.

The Wide, Wide World. By Susan Warner.

4d. each.

THE TINY LIBRARY.

Books printed in large type. Cloth.

Little Chrissie, and other Stories.

Harry Carlton’s Holiday.

A Little Loss and a Big Find.

What a Little Cripple Did.

Bobby.

Matty and Tom.

The Broken Window.

John Madge’s Cure for Selfishness.

The Pedlar’s Loan.

Letty Young’s Trials.

Brave Boys.

Little Jem, the Rag Merchant.

NEW FOURPENNY SERIES.

of Cloth-bound Books for the Young. With Coloured Frontispieces. 64 pages. Well Illustrated. Handsome Cloth Covers.

Poppy; or, School Days at Saint Bride’s.

Carrie and the Cobbler.

Dandy Jim.

A Troublesome Trio.

Perry’s Pilgrimage.

Nita; or, Among the Brigands.

The Crab’s Umbrella.

Sunnyside Cottage.

Those Barrington Boys.

Two Lilies.

Robert’s Trust.

CHEAP “PANSY” SERIES.

Imperial 8vo. 64 pages. Many Illustrations. Cover printed in Five Colours.

*The Strait Gate. By Annie S. Swan.

*Mark Desborough’s Vow. By Annie S. Swan.

*Her Saddest Blessing.

Miss Priscilla Hunter, and other Stories.

Wild Bryonie.

Avice. A Story of Imperial Rome.

A Young Girl’s Wooing.

Spun From Fact.

A Sevenfold Trouble.

From Different Standpoints.

Those Boys.

Christie’s Christmas.

Wise to Win; or, The Master Hand.

Four Girls at Chautauqua.

The Chautauqua Girls at Home.

Ruth Erskine’s Crosses. }

Ester Ried.

Julia Ried.

Ester Ried yet Speaking. }

An Endless Chain.

Echoing and Re-echoing.

Cunning Workmen.

Tip Lewis and His Lamp.

The King’s Daughter.

Wise and Otherwise. }

Household Puzzles.

The Randolphs. }

Mrs. Solomon Smith Looking On.

Links in Rebecca’s Life.

Interrupted.

The Pocket Measure.

Little Fishers and their Nets.

A New Graft on the Family Tree.

The Man of the House.

3d. each.

THE PRETTY “GIFT-BOOK” SERIES.

With Coloured Frontispiece, and Illustrations on every page. Paper boards, Covers printed in Five Colours and Varnished, 3d.; cloth boards, 4d. each.

My Pretty Picture Book.

Birdie’s Picture Book.

Baby’s Delight.

Mamma’s Pretty Stories.

Tiny Tot’s Treasures.

Papa’s Present.

Pretty Bible Stories.

Baby’s Bible Picture Book.

BOOKS BY CHAS. M. SHELDON,

Author of “In His Steps,” etc., etc.

OUR EXEMPLAR; OR, WHAT WOULD JESUS DO?

(IN HIS STEPS.)

Cloth boards, gilt edges, 2s. 6d.; cloth boards, 2s.; paper boards, 1s. 6d.

Special Edition in art linen, 1s.

“No one can read it without realising how far we are behind the great Example. Few will read it without being fired with the resolve to walk in His steps.”—Rev. J. CLIFFORD, M.A., D.D.

THE CRUCIFIXION OF PHILLIP STRONG.

Cloth boards, gilt edges, 2s. 6d.; cloth boards, 2s.; paper boards, 1s. 6d.

Special Edition in art linen, 1s.

A powerful story of self-abnegation and its fruits.

HIS BROTHER’S KEEPER.

Cloth boards, gilt edges, 2s. 6d.; cloth boards, 2s.; paper boards, 1s. 6d.

Special Edition in art linen, 1s.

A stirring narrative on the great theme of Christian responsibility.

ROBERT HARDY’S SEVEN DAYS:

A Dream and Its Consequences.

160 pages, cloth boards, 1s.

A sure energiser of vigorous Christian effort.

RICHARD BRUCE.

Cloth boards, gilt edges, 2s. 6d.; cloth boards, 2s.; paper boards, 1s. 6d.

Special Edition in art linen, 1s.

A story of earnest Christian effort for the good of others by word, deed, and pen.

THE TWENTIETH DOOR.

Cloth boards, gilt edges, 2s. 6d.; cloth boards, 2s.; paper boards, 1s. 6d.

Special Edition in art linen, 1s.

MALCOLM KIRK.

224 pages, cloth boards, 1s.

A thrilling story of consecrated effort in a frontier settlement.

A Cheap Edition of the above books, in paper covers for distribution, can also be had, price 6d. each.

8 & 9, PATERNOSTER ROW, E.C.

Transcriber’s Notes:

This catalogue was extracted from F. M. Holmes, Firemen and Their Exploits: With Some Account of the Rise and Development of Fire-Brigades, of Various Appliances for Saving Life at Fires and Extinguishing the Flames, S. W. Partridge & Co., London, 1899.

Punctuation and formatting have been made consistent.

*** END OF THE PROJECT GUTENBERG EBOOK CATALOGUE OF S. W. PARTRIDGE & CO.'S POPULAR ILLUSTRATED BOOKS ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

Catalogue OF S. W. PARTRIDGE & CO.’S POPULAR ILLUSTRATED BOOKS.

5s. each.

3s. 6d. each.

2s. 6d. each.

“ROMANCE OF COLONIZATION.”

THE “RED MOUNTAIN” SERIES.

2s. each.

THE HOME LIBRARY.

1s. 6d. each.

THE “WORLD’S WONDERS” SERIES.

NEW SERIES OF MISSIONARY BIOGRAPHIES.

NEW POPULAR BIOGRAPHIES.

THE BRITISH BOYS’ LIBRARY.

THE BRITISH GIRLS’ LIBRARY.

NEW PICTURE BOOKS.

ILLUSTRATED REWARD BOOKS.

1s. each.

ONE SHILLING REWARD BOOKS.

POPULAR SHILLING SERIES.

CHEAP REPRINTS OF POPULAR STORIES FOR THE YOUNG.

PICTURE BOOKS FOR THE YOUNG.

BOOKS BY REV. DR. NEWTON.

9d. each.

NINEPENNY SERIES OF ILLUSTRATED BOOKS.

6d. each.

NEW SERIES OF SIXPENNY PICTURE-BOOKS.

THE “RED DAVE” SERIES.

THE MARIGOLD SERIES.

4d. each.

THE TINY LIBRARY.

NEW FOURPENNY SERIES.

CHEAP “PANSY” SERIES.

3d. each.

THE PRETTY “GIFT-BOOK” SERIES.

BOOKS BY CHAS. M. SHELDON, Author of “In His Steps,” etc., etc.

Transcriber’s Notes:

THE FULL PROJECT GUTENBERG LICENSE